Data sample

▷ Runs between Sep 28 and Sep 30 ▷ the same version of trigger (1.4) ▷ the same L3 and L1 bits ▷ the same prescale factor for JT HI trigger ▷ integrated luminosity DØ was exposed to L_{int} ≈ 150 nb^{−1}

Quality cuts

▷ Jet quality cuts - HotF < 10 - 0.2 < EMF < 0.8 - CHF < 0.3 - n90 > 2 ▷ from MC the rejection factor of these cuts is about 10%

3

4

5

6

7

8

9

Luminosity on L1

▷ Run 132417 ▷ integrated luminosity DØ was exposed to L_{int} ≈ 52 nb^{−1} ▷ number of stored events N_{stored} = 51603 ▷ number of reconstructed events N_{reco} = 51603 ▷ luminosity for each luminosity block and for each L1 trigger calculated by Michael Begel ▷ package lm access used to access the luminosity information in the data analysis

11

12

13